Fit: Sigma vs. energy for 0.1, 0.5, 1.0, 2.0, 3.0, and 3.5GeV photons in the (θ,ϕ) = (10,5) direction. Left: σ_0 = 1.5, error offset B=2.0. Right: σ_0 = 2.5, error offset B=5.0.