/ ndf

2χ 24.02 / 28 Constant 1.16±

14.57 Mean 5.7±

149.5 Sigma 6.72± 74.35

cosmic pulse height (5 channels = 1 pixel)

0 50 100 150 200 250 300 350 400 450 counts

0 5 10 15 20 25 30 35