ped_h1 Entries 104670 Mean 516.4 RMS 114.9

ADC 0 500 1000 1500 2000 2500 3000 3500 4000 0 1000

2000

3000

4000

5000

6000

7000

8000

pch 14

Pre-irradiation sig_h1

Entries 103447 Mean 3849 RMS 928.4

ADC 0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 200 400 600 800 1000

1200

1400

1600

1800

pch 14

ped_h2 Entries 101342 Mean 1245 RMS 475.4

ADC 0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 500 1000

1500

2000

2500

3000

3500

pch 14

Post_irradiation sig_h2 Entries 101456 Mean 3689 RMS 1069

ADC 0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 200 400 600 800 1000

1200

1400

1600

1800 sig_h2

pch 14

ped_h3

Entries 103320 Mean 1312 RMS 481.8

ADC 0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 500 1000

1500

2000

2500

3000

3500

pch 14

2 days recovery sig_h3 Entries 101168 Mean 3560 RMS 1056

ADC 0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 200 400 600 800 1000

1200

1400

1600

1800

pch 14

ped_h4

Entries 101044 Mean 1239 RMS 468.9

ADC 0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 500 1000

1500

2000

2500

3000

3500

pch 14

6 days recovery sig_h4

Entries 100862 Mean 3643 RMS 1011

ADC 0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 200 400 600 800 1000

1200

1400

1600

1800

pch 14