Time [h]

0 20 40 60 80 100 120 140 160

A)μ Dark Current (

20 20.5 21 21.5 22 22.5 23 23.5 24 24.5

/ ndf

2χ 0.1599 / 3

Base Line (uA) 0.5663± 19.97

Acute Damage (uA) 0.5469± 4.226

Time Constant (h) 19.53± 61.82

Recovery of Dark Current

= 36.3 V

bias V C^°

T = 24.7