Accumulated Dose [rem]

0 2 4 6 8 10 12 14 16 18 20 22

A]μ Dark Current [

5

10

15

20

25

/ ndf

2χ 1.385 / 3 p0 0.6094 ± 6.136 p1 0.05146 ± 0.8883 ± ±

Increase of Dark Current with Radiation Dose

= 36.3 V

bias V C^°

T = 23