GlueX (Hall D) solenoid - basic, 1500A

                                                                                     C:\my_poisson\GLUEX_SOL_01.AM  7-29-2009   2:03:56

  0

 50

100

150

200

250

300

350

0

50

100

150

200

250

300

350

         -50 0 50 100 150 200 250 300 350 400 450