40 50 60 70 80 90 100 0

100

200

300

400

500

600

distance from gap center (perp. to magnet, cm)

|B| (G)

Stray fields outside tagger magnet gap

+10cm +5cm (cur. des.) -5cm -10cm -15cm -20cm