30 40 50 60 70 80 90 100

-250

-200

-150

-100 -50 0 50 100 150

x (cm)

B (G)

Stray Fields for w = -4 Design

B_z(h=-16, b=-10) B_y(h=-16, b=-10) B_z(h=-12, b=-5) B_y(h=-12, b=-5) B_z(h=-8, b=0) B_y(h=-8, b=-0)