55 60 65 70 75 80 85 90 95 100 0

1

2

3

4

5

6

7 x 10^{-3}

distance from gap center (perp. to magnet, cm)

|B| (T)

Stray Fields

-10.0cm -7.5cm -5.0cm -2.5cm cur. des. +10.0cm