0.85 0.9 0.95 1 1.05 1.1 1.15

0.85 0.9 0.95 1 1.05 1.1 1.15 1.2

deviation from 3cm gap deviation from nominal field y = - 0.968*x + 1.98

1.56% slope 0.78% slope