/ ndf

2χ 97.42 / 98 p0 14.9± 4321 p1 0.005 ± 0.243

pair azimuthal angle (r)

0 1 2 3 4 5 6 diff. cross section (ub/r)

0

2000

4000

6000

8000

10000 ±