\begin{thebibliography}{1}

\bibitem{active_collimator_idea_article}
G.~Miller and D.R. Waltz.
\newblock {\em Nucl.\ Instr.\ and Meth.}, \bf 117:33, 1974.

\end{thebibliography}
