\begin{frontmatter}

\begin{center}

{\Large{\bf{The Technical Design of the Hall-D Polarized Photon Beam
at the Thomes Jefferson National Accelerator Facility.}}}\\[0.5in]


\emph{The Hall-D Polarized Photon Beam Collaboration}
\vspace*{0.2in}

F.~J.~Klein, D.~Sober \\
{\em{Catholic University of America (Washington, D. C.}}
\vspace*{0.2in}

R.~Jones, K.~ Joo \\
{\em{University of Connecticut (Storrs, CT)}}
\vspace*{0.2in}


J.~ Annand, D.~Ireland, K.~Livingston, G.~Rosner\\
{\emph{University of Glasgow (Glasgow, Scotland)}} 
\vspace*{0.2in}


E.~C.~Aschenauer (Hall D Group Leader), F.~Barbosa, B.~Crahen, \\
C.Hutton, J.~Lagner, S~Razmyslovich,\\ 
E.~Smith (Hall D Deputy Group Leader), A.~Somov, J.~Stewart,\\
T.~Whitlatch, E.~Wolin\\

{\em{Jefferson Lab (Newport News,VA)}}
\vspace*{0.2in}




\vspace*{0.2in}

\clearpage
{\tiny{\bf{The Technical Design of the Hall-D Polarized Photon Beam at teh Thomas Jefferson national Accelerator Facility}}}
\end{center}
\clearpage
\end{frontmatter}
