\chapter{Photon Beam}\label{chapter_beam}

\input{ch4_intro}
\input{ch4_technical}
\input{ch4_description}
\input{ch4_electron}
\input{ch4_tagger}
\input{ch4_polarimeter}
\input{ch4_rates}




