Summary and Outlook

There is a solid and compelling physics case for Hall D.

Good conceptual design exists, and the collaboration is far into the optimization of components

To keep the momentum going, it is critical to start R&D work on much of the detector.

Much of this R&D work is generic to the CEBAF upgrade.

The Collaboration has made tremendous progress to date, and is ready to start serious R&D efforts.