Particle Identification

Rensselaer, IHEP Serpukhov, Indiana Univ. (Carnegie Mellon, Univ. of Regina)

Cherenkov Detector - Optimize design for detector. High- pressure vs atmospheric. Threshold vs Imaging - Magnetic Field Issues - Prototype of proposed design.

Time of Flight Wall - Prototypes for time resolution. - Magnetic Field Issues - Beam tests in Russia, Fall ’2000

Tracking: Good dE/dx in chambers

Calorimetry: Time of Flight in Barrel