Barrel Calorimetry

University of Regina, Norfolk State

Forward Calorimeter

Indiana University Existing Detector being moved from BNL - restacking - new bases - possible magnetic shielding issues

4 meter Long Calorimeter - good photon energy resolution - neutron detection - time of flight at ~100ps

Based on JETSET and KLOE design - technology transfer - develop manufacturing technique - optimize choice of materials - develop calibration methods