The Photon Beamline and Tagger

c

▷◁ Tagger based on existing Hall B tagger.

Hall D will tag a smaller E_γ Bite. ▷◁ Polarized beam based on Hall B work.

Currently being implemented for lower E_γ.

R&D Issues ( University of Connecticut and Catholic University)

□ Growth of thin synthetic diamond crystals. □ Thinning of natural diamond crystals to < 50μm. □ Collimator feed–back system.

It is necessary to start work now to make sure we can achieve the proposed level of linear polarization.