Event[kornicer] Fri Jul 2 10:26:37 2004

                                                                           Rad Phi

 Energy
(in MeV)

      0

      100

      200

      300

      400

Next event

                                                                                                              Goto event

File

                                                                                                                online Match Up
LG scale
Connect

Trigger
Select

                                                                                                 Real World X: 79.33 cm
                                                                                                 Real World Y: 66.67 cm
                                                                                                 Distance from beam: 103.63 cm
                                                                                                 Angle from beam: 0.803 rad

                                                               1^{Energy:  1.854 GeV    Position X: -28.2}

                                                                                                                                     Y: -32.2

                                                               2^{Energy:  1.987 GeV    Position X: 45.0}

                                                                                                                                     Y: 15.0

                                                               3^{Energy:  0.618 GeV    Position X: -31.7}

                                                                                                                                     Y: -7.7

                                                               4^{Energy:  0.426 GeV    Position X: -38.0}

                                                                                                                                     Y: -14.5

                                                                                                 Kinematics of 0 marked photons:

                                                                                                 Total energy:     0.0000 GeV
                                                                                                 Invariant mass:   0.0000 GeV
                                                                                                 t-Invariant:     0.0000 GeV2

Troels C. Petersen, NBI/Jefferson Lab, June 1996

Filename: simData9.itape   Run: 9999
Event number: 106

                                                Unknown Trigger

(Looking Downstream)

     Monte Carlo data

1

2

3 4