/ ndf

2χ 134.7 / 107 p0 0.0003 ± 0.1341 p1 0.273± 7.133 p2 0.0029 ± -0.1037

pulse number at 50 Hz

80 100 120 140 160 180 200 pulse power (J)

0

0.05

0.1

0.15

0.2

0.25 / ndf ^2χ 134.7 / 107 ± ±

energy vs pulse number