-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 0

0.2

0.4

0.6

0.8

1

Acceptance

Cos(θ_{GJ})

5 GeV

Mass(X) = 1.4 GeV Mass(X) = 1.7 GeV Mass(X) = 2.0 GeV

-3 -2 -1 0 1 2 3 0

0.2

0.4

0.6

0.8

1

Acceptance ϕ_{GJ}

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 0

0.2

0.4

0.6

0.8

1

Acceptance

Cos(θ_{GJ})

8 GeV

Mass(X) = 1.4 GeV Mass(X) = 1.7 GeV Mass(X) = 2.0 GeV

-3 -2 -1 0 1 2 3 0

0.2

0.4

0.6

0.8

1

Acceptance ϕ_{GJ}

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 0

0.2

0.4

0.6

0.8

1

Acceptance

Cos(θ_{GJ})

12 GeV

Mass(X) = 1.4 GeV Mass(X) = 1.7 GeV Mass(X) = 2.0 GeV

-3 -2 -1 0 1 2 3 0

0.2

0.4

0.6

0.8

1

Acceptance ϕ_{GJ}

γp -> n η π^+ π^+ π^−